/*
 * pci.h - PCI header for X-Sys
 * Copyright (C) 2005 Tony Vroon
 *
 * This program is free software; you can redistribute it and/or modify
 * it under the terms of the GNU General Public License as published by
 * the Free Software Foundation; either version 2 of the License, or
 * (at your option) any later version.
 *
 * This program is distributed in the hope that it will be useful,
 * but WITHOUT ANY WARRANTY; without even the implied warranty of
 * MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
 * GNU General Public License for more details.
 *
 * You should have received a copy of the GNU General Public License
 * along with this program; if not, write to the Free Software
 * Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA  02111-1307  USA
 */


#ifndef _PCI_H_
#define _PCI_H_

#include <pci/pci.h>
void pci_find_fullname(char *fullname, char *vendor, char *device);
int  pci_find_by_class(u16 *class, char *vendor, char *device);

#endif
